0.02 0.04 0.06 0.08 0.1

-0.08

-0.06

-0.04

-0.02 0 0.02

0.04

0.06

0.08

k_x (1/m) ky (1/m)

-1 -0.5 0 0.5 1 -2 -1.5 -1 -0.5 0 0.5 1 1.5 2

k_1 k_2 k_3 k_4

λ θ_3 θ_4

= 0.25 = 11.48° = -33.56°